X-Git-Url: http://git.shiar.nl/minimedit.git/blobdiff_plain/55cb3025c5506ec7faaa1818a4d8161aaad19c27..c824b14c0f6fb372ca4e72fe244b3aade6c29541:/widget/comments.sql

diff --git a/widget/comments.sql b/widget/comments.sql
index 5e33716..924c136 100644
--- a/widget/comments.sql
+++ b/widget/comments.sql
@@ -5,6 +5,7 @@ CREATE TABLE issues (
 	body       text,
 	created    timestamptz          DEFAULT now(),
 	closed     timestamptz          DEFAULT now(),
+	updated    timestamptz NOT NULL DEFAULT now(),
 	author     text,
 	id         serial      NOT NULL PRIMARY KEY
 );
